----------------------  GRAPHICS - External DOS Command  -----------------------

GRAPHICS allows a graphics screen display to be printed on a graphics printer.

FORMAT:   GRAPHICS

REMARKS:

   This command must be used prior to pressing SHIFT-PRTSC to print a graphics
   screen display.

   The resident size of DOS (amount of memory used by DOS) is increased by 736
   bytes.

   In 320 x 200 color graphics mode, the printout will have up to four shades of
   gray.  In 640 x 200 color graphics mode, the printout will be rotated 90
   degrees counter-clockwise.  The upper right corner of the screen will be the
   upper left corner of the printout.

   Printing a graphics display may take as long as three minutes.

   Once GRAPHICS is executed, it stays in effect until DOS is restarted.

EXAMPLE:

Print a graphics screen display:

          GRAPHICS

   then hold down the SHIFT key and press PRTSC to print the screen.
